\makeatletter
\def\@title{Book list}
\makeatother
\setlongtables
\bgroup
\extrarowheight2pt
\tabcolsep2pt
\footnotesize

\begin{longtable}{|p{0.33\linewidth}p{0.33\linewidth}lcr|}
\hline
\multicolumn{5}{|c|}{\textbf{Addison-Wesley Books}}\\
\hline
The \TeX\ book&Donald E Knuth&0 201 13448 9&paper&20.50\\
The \TeX\ book&Donald E Knuth&0 201 13447 0&hard&29.50\\
\TeX\ the program&Donald E Knuth&0 201 13437 3&hard&34.00\\ 
The \MF book&Donald E Knuth&0 201 13444 6&paper&18.50\\
The \MF book&Donald E Knuth&0 201 13445 4&hard&29.50\\
\MF\ the program&Donald E Knuth&0 201 13438 1&hard&34.00\\
Computer Modern Type\-faces&Donald E Knuth&0 201 13446 2&hard&34.00\\
3:16 Bible texts illuminated\kern0pt&Donald E Knuth&0 895 79252 4&paper&19.50\\ 
The CWEB system of structured documentation&
Donald E Knuth \& Silvio Levy&0 201 57569 8&paper&17.00\\
\LaTeX: a document preparation system, second edition&
Leslie Lamport&0 201 52983 1&paper&24.00\\
The \LaTeX\ Companion&Michael Goossens, Frank Mittelbach \& Alexander Samarin&
0 201 54199 8&paper&24.00\\
Introduction to \TeX&Norbert Schwarz&0 201 51141 X&paper&19.50\\
A guide to \LaTeX&Helmut Kopka \& Patrick Daly&0 201 56889 6&paper&22.00\\
\TeX\  by topic&Victor Eijkhout&0 201 56882 9&paper&22.00\\
\TeX\ for the impatient&Paul~W~Abrahams, Kath\-ryn Hargreaves \& Karl Berry&
0 201 51375 7&paper&20.50\\
\hline
Postscript language program manual&Adobe&0 201 18127 4&paper&24.00\\
Postscript language, tutorial \& cook\-book&Adobe&0 201 10179 3&paper&15.00\\
Portable Document Format Reference Manual&Adobe&0 201 62628 4&paper&18.50\\
The Postscript Font hand\-book&Jonathon~Grosvenor, Kay Morrison \& Alexander Pim&
0 201 56893 4&paper&22.00\\
Postscript by example&Henry McGilton \& Mary Campione&0 201 63228 4&paper&23.00\\
Thinking in Postscript&Glenn Reid&0 201 52372 8&paper&18.50\\
\hline
Collier's rules for desktop design and typography&David Collier&0 201 54416 4&paper&15.00\\
Interactive Typography&David~Collier \& Ian Martin&0 201 63167 9&cd-rom&tba\\
\hline
\hline
\multicolumn{5}{|c|}{\textbf{O'Reilly Books}}\\
\hline
4.4BSD-Lite CD-ROM Companion& &1 56592 092 9&& 26.55\\
4.4BSD System Manager's Manual& &1 56592 080 5&& 19.80\\
4.4BSD User's Reference Manual& &1 56592 075 9&& 19.80\\
4.4BSD User's Supplementary Documents& &1 56592 076 7&& 19.80\\
4.4BSD Programmer's Reference Manual& &1 56592 078 3&& 19.80\\
4.4BSD Programmer's Supplementary Documents& &1 56592 079 1&& 19.80\\
Notable Speeches of the Information Age (tape)& Barlow&1 56592 992 6&& 6.75\\
Power Programming with RPC& Bloomer&0 937175 77 3&& 19.80\\
The Frame Handbook& Branagan, Sierra&1 56592 009 0&& 26.55\\
Learning GNU Emacs& Cameron&0 937175 84 6&& 18.45\\
ORACLE Performance Tuning& Corrigan&1 56592 048 1&& 32.40\\
Sendmail& Costales&1 56592 056 2&& 22.00\\
Using C on the UNIX System& Curry&0 937175 23 4&& 16.65\\
SCO UNIX in a Nutshell& Cutler&1 56592 037 6&& 6.75\\
Checking C Programs with lint& Darwin&0 937175 30 7&& 8.55\\
sed / awk& Dougherty&0 937175 59 5&& 18.45\\
High Performance Computing& Dowd&1 56592 032 5&& 17.35\\
Software Portability with imake& DuBois&1 56592 055 4&& 16.65\\
Connecting to the Internet& Estrada&1 56592 061 9&& 10.75\\
!\%@::A Directory of Electronic Mail Addressing / Networks 4e& Frey&1 56592 046 5&& 6.75\\
Essential System Administration& Frisch&0 937175 80 3&& 19.80\\
POSIX.4: Programming for the Real World& Gallmeister&1 56592 074 0&& 19.76\\
PGP: Pretty Good Privacy& Garfinkel&1 56592 098 8&& 11.95\\
Practical UNIX Security& Garfinkel&0 937175 72 2&& 19.80\\
UNIX in a Nutshell- System V /Solaris 2.0 2e& Gilly&1 56592 001 5&& 6.75\\
Understanding and Using COFF& Gircys&0 937175 31 5&& 14.65\\
Using Netnews& Harrison&1 56592 101 1&& 16.65\\
TCP/IP Network Administration& Hunt&0 937175 82 X&& 19.80\\
Multi-Platform Code Management& Jameson&1 56592 059 7&& 26.55\\
Migrating to Fortran 90& Kerrigan&1 56592 049 X&& 16.65\\
Linux Network Administrator's Guide& Kirch&1 56592 087 2&& 16.65\\
The Mosaic Handbook for the Macintosh& Koman&1 56592 096 1&& 19.80\\
The Mosaic Handbook for Microsoft Windows& Koman&1 56592 094 5&& 19.80\\
The Mosaic Handbook for the X Window System& Koman, Ferguson&1 56592 095 3&& 19.80\\
 The Whole Internet Users Guide /Catalog 2e& Krol&1 56592 063 5&& 16.65\\
Learning the vi Editor 5e& Lamb&0 937175 67 6&& 14.65\\
lex /yacc 2e& Levine&1 56592 000 7&& 19.80\\
POSIX Programmer's Guide& Lewine&0 937175 73 0&& 23.20\\
Exploring Expect: A Tcl-based Toolkit for Automating Interactive Programs& Libes&1 56592 090 2&& 19.75\\
DNS / BIND& Liu&1 56592 010 4&& 19.80\\
Managing Internet Information Services& Liu, Peek, Jone, Buus, Nye&1 56592 062 7&& 19.75\\
System Performance Tuning& Loukides&0 937175 60 9&& 16.65\\
UNIX for FORTRAN Programmers& Loukides&0 937175 51 X&& 16.65\\
Understanding Japanese Information Processing& Lunde&1 56592 043 0&& 20.65\\
Security and Networks (tape)& Malamud&1 56592 997 7&& 6.75\\
Networked Information and Online Libraries (tape)& Malamud&1 56592 998 5&& 6.75\\
European Networking (tape)& Malamud&1 56592 999 3&& 6.75\\
Global Network Operations (tape)& Malamud&1 56592 993 4&& 11.25\\
Mobile IP Networking (tape)& Malamud&1 56592 994 2&& 6.75\\
The Future of the Internet Protocol (tape)& Malamud&1 56592 996 9&& 16.65\\
Encyclopedia of Graphics File Formats& Murray, vanRyper&1 56592 058 9&& 39.60\\
Managing Projects with make 2e& Oram&0 937175 90 0&& 11.95\\
Practical C Programming 2e& Oualline&1 56592 035 X&& 16.65\\
MH /xmh: E-Mail for Users/Programmers 2e& Peek&1 56592 027 9&& 19.80\\
UNIX Power Tools with CD-ROM& Peek&0 553 35402 7&& 39.60\\
Love Your Job!& Powers&1 56592 036 8&& 8.55\\
Building a Successful Software Business& Radin&1 56592 064 3&& 16.65\\
Understanding DCE& Rosenberry&1 56592 005 8&& 16.65\\
Distributing Applications Across DCE and Windows NT& Rosenberry&1 56592 047 3&& 16.65\\
Learning the Korn Shell& Rosenblatt&1 56592 054 6&& 18.45\\
Computer Security Basics& Russell&0 937175 71 4&& 19.80\\
Smileys& Sanderson&1 56592 041 4&& 4.00\\
Learning Perl& Schwartz&1 56592 042 2&& 16.65\\
guide to Writing DCE Applications 2e& Shirley&1 56592 045 7&& 22.50\\
Managing NFS and NIS& Stern&0 937175 75 7&& 18.45\\
Programming with curses& Strang&0 937175 02 1&& 8.55\\
termcap /terminfo& Strang&0 937175 22 6&& 14.65\\
Manging UUCP and Usenet 10e& Todino&0 937175 93 5&& 18.45\\
Using UUCP and Usenet& Todino&0 937175 10 2&& 14.65\\
Learing the UNIX Operating System 3e& Todino&1 56592 060 0&& 6.10\\
Programming Perl& Wall&0 937175 64 1&& 19.80\\
Making \TeX\ Work& Walsh&1 56592 051 1&& 19.75\\
\multicolumn{5}{|l|}{\emph{The X Window System Series}}\\
The X Window System in a Nutshell& X Window System, Release 6, Companion CD&1 56592 084 8&& 19.75\\
X Protocol Reference Manual Vol 0& Nye&1 56592 008 2&& 23.20\\
Xlib Programming Manual Vol 1& Nye&1 56592 002 3&& 23.20\\
Xlib Reference Manual Vol2& Nye&1 56592 006 6&& 23.20\\
X Window System User's Guide Vol 3& Quercia&1 56592 014 7&& 23.20\\
X Window system User's Guide Vol 3M& Quercia&1 56592 015 5&& 23.20\\
X Toolkit Intrinsics Programming Manual Vol 4& Nye&1 56592 003 1&& 23.20\\
X Toolkit Intrinsics Programming Manual Vol 4M& Nye&1 56592 013 9&& 23.20\\
X Toolkit Intrinsics Reference Manual Vol 5& Flanagan&1 56592 007 4&& 23.20\\
Motif Programming Manual Vol 6A& Heller&1 56592 016 3&& 23.20\\
Motif Reference Manual Vol 6B& Ferguson&1 56592 038 4&& 23.20\\
XView Programming Manual Vol 7A& Heller&0 937175 87 0&& 23.20\\
XView Reference Manual Vol 7B& Van Raalte&0 937175 88 9&& 25.65\\
X Window System Administrator's Guide Vol 8& Mui&0 937175 83 8&& 19.80\\
X User Tools& Mui, Quercia&1 56592 019 8&& 33.25\\
Motif Tools: Streamlined GUI Design and Programming with the Xmt Library& Flanagan&1 56592 004 9&& 36.45\\
Programmer's Supplement to X11, R6& Nye&1 56592 089 9&& 16.65\\
PEXlib Programing Manual& Gaskins&1 56592 028 7&& 29.70\\
PEXlib Reference Manual& Talbott&1 56592 029 5&& 26.55\\
PHIGS Programming Manual (softcover)& Gaskins&0 937175 85 4&& 28.35\\
PHIGS Programming Manual (hardcover)& Gaskins&0 937175 92 7&& 39.55\\
PHIGS Reference Manual& Kosko&0 937175 91 9&& 26.55\\
X Resource: Issue 11 (Back Issues Available)& Ferguson&1 56592 068 6&& 9.85\\
\hline
\end{longtable}
\egroup
